-- Copyright (C) 2026 Eduard Wisch <data@data-it-solution.de>
--
-- This program is free software; you can redistribute it and/or modify
-- it under the terms of the GNU General Public License as published by
-- the Free Software Foundation; either version 3 of the License, or
-- (at your option) any later version.
--
-- Tabelle: ein Tool-Lauf (Messung) innerhalb eines Diagnose-Protokolls.
-- params/result sind generisches JSON -> neue Tools brauchen kein Schema-Update.

CREATE TABLE llx_netdiag_measurement(
	rowid          integer AUTO_INCREMENT PRIMARY KEY NOT NULL,
	entity         integer DEFAULT 1 NOT NULL,
	fk_protocol    integer NOT NULL,
	fk_device      integer,
	tool           varchar(64) NOT NULL,
	category       varchar(32),
	label          varchar(255),
	params         text,
	result         longtext,
	measure_status smallint DEFAULT 0 NOT NULL,
	date_measure   datetime,
	date_creation  datetime NOT NULL,
	tms            timestamp DEFAULT CURRENT_TIMESTAMP NOT NULL
) ENGINE=innodb;
