-- ============================================================================
-- Copyright (C) 2026 Alles Watt lauft
--
-- Equipment Panel table (Schaltschrankfelder)
-- Represents physical sections/fields in a distribution board
-- ============================================================================

CREATE TABLE llx_kundenkarte_equipment_panel (
    rowid           INTEGER AUTO_INCREMENT PRIMARY KEY,
    entity          INTEGER DEFAULT 1 NOT NULL,

    fk_anlage       INTEGER NOT NULL,           -- Zählerschrank/UV that contains this panel
    label           VARCHAR(128),               -- "Feld 1", "Linkes Feld", etc.
    position        INTEGER DEFAULT 0,          -- Order (left to right)

    note_private    TEXT,
    status          SMALLINT DEFAULT 1,         -- 1=active, 0=inactive

    date_creation   DATETIME,
    tms             TIMESTAMP DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
    fk_user_creat   INTEGER,
    fk_user_modif   INTEGER,
    import_key      VARCHAR(14),

    INDEX idx_panel_anlage (fk_anlage),
    CONSTRAINT fk_panel_anlage FOREIGN KEY (fk_anlage)
        REFERENCES llx_kundenkarte_anlage(rowid) ON DELETE CASCADE
) ENGINE=InnoDB;
